The humble medicine syringe!  Tyler sat on the floor last night and played contented with this syringe for over 30 minutes!  For a baby with the attention span of a housefly, this was an incredbily long time.  He just sat there and chewed on it, held it up, turned it over and over, chewed on it some more, inspected it very carefully, chewed on it some more,